./brute.fi 381,114,396 bytes x ms

ms 0.0 2000.0 4000.0 6000.0 8000.0 10000.0 12000.0 14000.0 16000.0 18000.0 bytes

0k

2k

4k

6k

8k

10k

12k

14k

16k

heap-admin x4201FA01:_nl_intern_loca x8071A24:stgMallocBytes stack(s)